\section{Introduction}
Batteryless systems.
Intermittent system consists of hardware and software.

\begin{figure}
    \centering
    \includegraphics[width=\linewidth]{figs/intermittent_computing.pdf}
    \caption{caption}
    \label{fig:introduction}
\end{figure}